C3 2.2n

c0603

Vcc

Vss

R3 1k c0603

vignd out

C5 100n c0603

C4 100n vss_filtered vcc_filtered 3 + 4 - 1 5 VCC

2 VSS

AD8005 U1

SOT23_5 CFA R2 330 c0603

C1 6.8n

c0603

R1 14.5 c0603

pz in

R575c0603

R475c0603