Q1 Cin

Cfb

Rfet Ra2

Ra1

Vcc

Vss

1 2 5 4

3 AOP VCC

VSS

X1

CFA

Rfb

Vfet

INP

OUT

10Meg

1p

Ca 1n

22k

22k

750

1n

Vfet

Cfet 100n